Time (h)

0 10 20 30 40 50 60 70 80

Minimum Position BCD (mm)

19 19.2

19.4

19.6

19.8 20 20.2

20.4

20.6

20.8 21 Raw Data from Min Pos BCD T2.4 Run 2