BCD (mm)

64.06 64.07 64.08 64.09 64.1 64.11 64.12 64.13 64.14 64.15 64.16

Entries

0 50 100 150 200 250 300 350 400 450 Target 1 Hold Position 16/09/2009

Time (s)

0 5 10 15 20 25 3 10×

BCD (mm)

64.06

64.07

64.08

64.09

64.1

64.11

64.12

64.13

64.14

64.15

64.16

Hold Position vs Time 16/09/2009