BCD (mm)

64.14 64.15 64.16 64.17 64.18 64.19 64.2 64.21 64.22 64.23 64.24

Entries

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 3 10× Target 1 Hold Position 10/09/2009

Time (s)

0 5 10 15 20 25 30 3 10×

BCD (mm)

64.14

64.15

64.16

64.17

64.18

64.19

64.2

64.21

64.22

64.23

64.24

Hold Position vs Time 10/09/2009